<template>
  <div style="height: 100%" id="baobiao">
    <iframe
      :src="url"
      width="100%"
      height="100%"
      frameborder="0"
      scrolling="auto"
      style="background: #fff"
    ></iframe>
  </div>
</template>
<script>
export default {
  data() {
    return {
      url: "./static/iframe.html",
      //   url: "https://202.99.219.114:28888/qjny/report/view/report?viewlet=清洁能源/生产部门日周月报/日报表填报-加发电量.cpt&op=write",
      //   url: "https://202.99.219.114:28888/qjny/report/view/report?viewlet=清洁能源/生产部门日周月报/周报表展示.cpt&op=write",
      //   url: "https://202.99.219.114:28888/qjny/report/view/report?viewlet=清洁能源/生产部门日周月报/周报表展示.cpt",
    };
  },
};
</script>
<style lang="less" scope>
@titleGray: #9ca5ab;
@rowGray: #606769;
@darkBack: #536268;
.knowledge-2 {
  .el-select {
    width: 200px;
  }
  .el-input {
    width: 200px;
  }
}
</style>
