<template>
	<div class="decision-page-2">
		场内对标
		<normal-radar-chart :height="'500px'" />
	</div>
</template>

<script>
	import NormalRadarChart from "../../components/chart/radar/normal-radar-chart.vue";
	export default {
		components: {
			NormalRadarChart
		},
		data() {
			return {}
		},
		created() {
			
		},
		methods: {
			
		}
	};
</script>

<style lang="less">
	.decision-page-2 {
		.project-table {
			overflow: auto;

			tbody {
				height: 189px;
			}

			th,
			td {
				color: #b2bdc0;

				&:nth-child(1) {
					width: 50px;
				}

				&:nth-child(2) {
					width: 50px;
				}
			}
		}
	}
</style>
