<template>
    <div style="height: 100%">
        <iframe :src="url" width="100%" height="100%" frameborder="0" scrolling="auto"></iframe>
    </div>
</template>
<script>
    export default {
        data() {
            return {
                url: "http://10.220.1.5:8001/rbi/ebibase/showreport.do?resid=EANA$2$2$1$72977a47b6154b299ebcc708634e63dc$f6c89c7391914af08b438662b125e26a&id=admin&pw=admin",
            };
        },
    };
</script>
<style lang="less" scope>
    @titleGray: #9ca5a8;
    @rowGray: #606769;
    @darkBack: #536268;

    .knowledge-2 {
        .el-select {
            width: 200px;
        }

        .el-input {
            width: 200px;
        }
    }
</style>