<template>
  <div style="height: 100%">
    <iframe
      :src="url"
      width="100%"
      height="100%"
      frameborder="0"
      scrolling="auto"
    ></iframe>
  </div>
</template>
<script>
export default {
  data() {
    return {
      url:
        process.env.VUE_APP_REPORT +
        "/rbi/ebibase/showreport.do?resid=EANA$2$2$1$72977a47b6154b299ebcc708634e63dc$5f10b329ed3442188ea883113c3039f6&id=admin&pw=GYpt.6388@7590*",
    };
  },
};
</script>
<style lang="less" scope>
@titleGray: #9ca5a8;
@rowGray: #606769;
@darkBack: #536268;

.knowledge-2 {
  .el-select {
    width: 200px;
  }

  .el-input {
    width: 200px;
  }
}
</style>